-90

-60

-30

       0

   30

   60

-180

-120

-60

0

                                                                                                                     60

                                                             120

        180

Visual (550 nm)

-90

-60

-30

        0

   30

   60

   90

-120

-60

0

                                                                                                                      60

                                                              120

        180

850 GHz (350 μ)