DECLINATION (J2000)

RIGHT ASCENSION (J2000)

10 32 36 35 34 33 32 31 30

54 24 30

25

20

15

10

05

00

23 55

50

45

HARO2 1450.0 KM/S IPOL HARO2C.R=1.VLM.1

PLot file version 1 created 21-OCT-2002 13:11:20