FIGURE A-2

Arp 295 VLA C+D HI Nat. Wt. Moment 0+1

DECLINATION

RIGHT ASCENSION

23 39 30 15 00 38 45

-03 46485052545658 A295b6950A295a6800 G8:6820

G7:6850 G6:6780 G5:6905G4:6610G3:6590G2:6740 G16840 +140 -140 +40-40 -20

-70 +50

+60 -60 -50+50

+250 -270-150-190

+20 -20 -60