MK231 RA 12 54 5.000 DEC 57 08 41.00 MK231C.R-1.LMV.1

Plot file version 2 created 23-MAY-1997 13:39:03

Average over area in X: 127 129 in Y: 128 130

MilliJY/BEAM

Kilo FELO-HEL

13000 12900 12800 12700 12600 12500 12400

0

-2

-4

-6

-8

-10

-12