GREY: NGC4038 1776.0 KM/S IPOL N4038CD.R+1.LMV.1

PLot file version 7 created 02-APR-1999 11:27:21

Grey scale flux range= -3.000 6.000 MilliJY/BEAM -18 455055

-19 00 1776.0 KM/S 1770.8 KM/S

1765.6 KM/S

1760.4 KM/S

1755.2 KM/S

-18 45

1744.8 KM/S

1739.6 KM/S

1734.4 KM/S

1729.2 KM/S

DECLINATION (J2000)

1718.8 KM/S

1713.6 KM/S

1708.4 KM/S

1703.2 KM/S

1692.8 KM/S

1687.6 KM/S

1682.4 KM/S

1677.2 KM/S

12 02 00

1666.8 KM/S

RIGHT ASCENSION (J2000)

1656.4 KM/S