FIGURE A-7

N520 System VLA C+D HI Nat. Wt. Channel Maps

N520

U957

MCG+00-04-124

Contour Levels = ( -2, 2, 4, 8, 16, 32 ) * 1E19 atoms/cm2

03 40 35 30 25 20

2510 2489 2468

03 40 35 30 25 20

2446 2425 2404

DECLINATION

03 40 35 30 25 20

2382 2361 2340

RIGHT ASCENSION

01 22 30 15 00 45

03 40 35 30 25 20

2319 2297

01 22 30 15 00 45

2276