FIG. A-7 (cont’d)

N520 System Channel Maps (cont’d)

Contour Levels = (-2, 2, 4, 8, 16, 32) * 1E19 atoms/cm2

03 40 35 30 25 20

2255 2233 2212

03 40 35 30 25 20

2191 2169 2148

DECLINATION

03 40 35 30 25 20

2127 2105 2084

RIGHT ASCENSION

01 22 30 15 45

03 40 35 30 25 20

2063 2041

01 22 30 15 45

2020