GREY: N520 B N520BVR.SQRT.1

CONT: NGC520 IPOL N520CD.NAT20.HGMOM1.1

PLot file version 1 created 06-OCT-1996 16:08:33

Grey scale flux range= 1.0 15.0 UNDEFINE Cont peak flux = 2.4588E+06 M/S Levs = 1.0000E+03 * ( 2060., 2080., 2100., 2120., 2140., 2160., 2180., 2200., 2220., 2240., 2260., 2280., 2300., 2320., 2340., 2360., 2380., 2400., 2420., 2440.)

DECLINATION

RIGHT ASCENSION

01 22 15 00 21 45

03 383634323028