260 2 8 0 3 0 0 3 2 0 3 4 0 3 6 0 3 8 0

- 1 0

0

1 0

2 0

3 0

4 0

5 0

6 0

7 0

8 0

line temperature

f r e q u e n c y

0 . 0

0 . 2

0 . 4

0 . 6

0 . 8

1 . 0

atm transm 1mm H2O

2 6 0 2 8 0 3 0 0 3 2 0 3 4 0 3 6 0 3 8 0

0

1 0

2 0 line temperature f r e q u e n c y

0 . 0

0 . 2

0 . 4

0 . 6

0 . 8

1 . 0 atm transm 1mm H2O